SET FOREIGN_KEY_CHECKS=0;

ALTER TABLE `ws_admins`
ADD COLUMN `google_secret` char(64) NULL DEFAULT NULL COMMENT '谷歌验证码';
ALTER TABLE `ws_users`
ADD COLUMN `google_secret` char(64) NULL DEFAULT NULL COMMENT '谷歌验证码';

SET FOREIGN_KEY_CHECKS=1;